-- 监测项“重复填写”默认值为否
update FormDefinitionItem set repeatWrite = '否' where repeatWrite is null
-- 监测定义“录入回收记录”默认值为否
update QualityMonitoringDefinition set recordRecycleInformation = '否' where recordRecycleInformation is null
-- 监测定义“录入清洗记录”默认值为否
update QualityMonitoringDefinition set recordRinseInformation = '否' where recordRinseInformation is null
-- 监测定义“录入灭菌记录”默认值为否
update QualityMonitoringDefinition set recordSterilizatioInformation = '否' where recordSterilizatioInformation is null