update ImageFile set imageType = '生物监测图片' where imageType = '灭菌监测图片';
update Rinser set useStatus = '在用';
update Sterilizer set useStatus = '在用';
update Rinser set sequence = (select count(*) from Rinser po where po.id < Rinser.id);