update SterilizationRecord set chemistryResult='合格' where chemistryResult is null;
update SterilizationRecord set physicsResult='合格' where physicsResult is null;
update Sterilizer set biologicalMonitoringDisplay='无' where biologicalMonitoringDisplay is null;