update FormDefinitionItem set repeatWrite = '否' where repeatWrite is null;
update QualityMonitoringDefinition set recordRecycleInformation = '否' where recordRecycleInformation is null;
update QualityMonitoringDefinition set recordRinseInformation = '否' where recordRinseInformation is null;
update QualityMonitoringDefinition set recordSterilizatioInformation = '否' where recordSterilizatioInformation is null;