update Sterilizer set monitorTousseDisplay = replace(monitorTousseDisplay, '每天第一炉', '每天第1炉') where monitorTousseDisplay = '每天第一炉' or monitorTousseDisplay like '每天第一炉;%' or monitorTousseDisplay like '%;每天第一炉;%' or monitorTousseDisplay like '%;每天第一炉';
update Sterilizer set monitorTousseDisplay = replace(monitorTousseDisplay, '每炉', '每炉(第1炉除外)') where monitorTousseDisplay = '每炉' or monitorTousseDisplay like '每炉;%'  or monitorTousseDisplay like '%;每炉;%'  or monitorTousseDisplay like '%;每炉';